-0.4 -0.2 0.0 0.2 0.4 0.6 0.8 1.0 0

20

40

60

80

100 21-1360 keV counts / 0.004 s

T - T0, s

0 10 20 30

360-1360 keV 0

20

40 83-360 keV counts / 0.004 s

-0.4 -0.2 0.0 0.2 0.4 0.6 0.8 1.0 0 10 20 30

KONUS - WIND GRB 060313 T0= 00726.354 s UT (00:12:06.354) S1

T-T_0, sec

21-83 keV