-0.5 0.0 0.5 1.0 1.5 0

50

100

150

200

KONUS-WIND GRB 090510 T_0 = 1381.547 s UT (00:23:01.547) S1

21-1360 keV counts / 0.016 s

T-T_0, s

0

20

40

360-1360 keV 0 20 40 60 83-360 keV counts / 0.016 s

-0.4 -0.2 0.0 0.2 0.4 0.6 0.8 1.0 1.2 1.4 0 20 40 60

T-T_0, s

21-83 keV