0 100 36 - 59 keV 0 100 23 - 36 keV

Counts, 0.128 s^{-1}

0 100 14 - 23 keV 0

100 9 - 14 keV

KONUS-RF (Coronas-Photon) S2 GRB090718 T_0=65863.878s UT

0 100 59 - 95 keV

0

100 95 - 157 keV

0

80 157 - 250 keV

0

50 250 - 407 keV

0

25 407 - 660 keV

0 10 20 30 40 50 60 70 0

25

T - T_0, s

660 - 1043 keV