-40 -20 0 20 40

4500

5000

5500

6000

6500

KONUS-WIND GRB 090813 T_0 = 15041.925 s UT (04:10:41.925) S2

18-1160 keV counts / 2.944 s

T - T_0, s

3000

3200

3400

300-1160 keV

1200

1400

70-300 keV counts / 2.944 s

-50 0 50 300 400 500 600

T-T_0, s

18-70 keV