0 20 40

400

600

800 21-1360 keV counts / 0.256 s

T - T_0, s

200

300

400

360-1360 keV 0

200 83-360 keV counts / 0.256 s

0 20 40 40 60 80 100

KONUS-WIND GRB 100103 T_0 = 63766.807 s UT (17:42:46.807) S1

T-T_0, sec

21-83 keV