0 5 10 15

500

750 18-1160 keV counts / 0.256 s

T - T_0, s

200

400

300-1160 keV 0

200 70-300 keV counts / 0.256 s

0 5 10 15 0

50

100

KONUS-WIND GRB 101112 T_0 = 79831.681 s UT (22:10:31.681) S2

T-T_0, s

18-70 keV