0 10 20 30 40 0

200

400

600

800

1000

KONUS-WIND GRB 110518 T_0 = 74290.767 s UT (20:38:10.767) S1 21-1360 keV counts / 0.064 s

T-T_0, s

0

200

400

360-1360 keV 0

200

400 83-360 keV counts / 0.064 s

-5 0 5 10 15 20 25 30 35 40 0 50 100

T-T_0, s

21-83 keV