0 20 40 60 80 300 350 400 450 500 550 600 21-1360 keV counts / 0.256 s

T - T_0, s

200

300

400

360-1360 keV

200 83-360 keV counts / 0.256 s

0 20 40 60 80 0

100

KONUS-WIND GRB 110709 T_0 = 77564.576 s UT (21:32:44.576) S1

T-T_0, sec

21-83 keV