0 50 100 150 200

500

1000 18-1160 keV counts / 0.256 s

T - T_0, s

200

400

300-1160 keV 0

200

400 70-300 keV counts / 0.256 s

0 50 100 150 200 0

50

100

KONUS-WIND GRB 111016 T_0 = 81700.723 s UT (22:41:40.723) S2

T-T_0, s

18-70 keV