-0.05 0.00 0.05 0.10 0

50

KONUS-WIND GRB 120817 T_0 = 14553.388 s UT (04:02:33.388) S1 21-1360 keV counts / 0.002 s

T - T_0, s

0 5 10 15

360-1360 keV 0 10 20 83-360 keV counts / 0.002 s

-0.05 0.00 0.05 0.10 0 5 10 15

T-T_0, sec

21-83 keV