0 5 10 0

200

21-1360 keV counts / 0.064 s

T-T_0, s

0

100

200

360-1360 keV 0

100 83-360 keV counts / 0.064 s

0 5 10 0

20

KONUS-WIND GRB 120919 T_0 = 26678.597 s UT (07:24:38.597) S1

T-T_0, s

21-83 keV