0 20 40 60 80

400

600

800 21-1360 keV counts / 0.256 s

T-T_0 (s)

200

300

400

360-1360 keV 0

200 83-360 keV counts / 0.256 s

0 20 40 60 80 0

50

KONUS-WIND GRB 131105 T_0 = 7527.233 s UT (02:05:27.233) S1

T-T_0 (s)

21-83 keV