0 1 2 3

100

200

300 21-1360 keV counts / 0.064 s

T-T_0 (s)

0

100

360-1360 keV 0

100 83-360 keV counts / 0.064 s

0 1 2 3 0 10 20 30

KONUS-WIND GRB 140506 T_0 = 76059.098 s UT (21:07:39.098) S1

T-T_0 (s)

21-83 keV