0 5 10 15 0

50

100

150

200

250

KONUS-WIND GRB 140529 T_0 = 34086.312 s UT (09:28:06.312) S1

21-1360 keV counts / 0.064 s

T-T_0 (s)

0

100

200

360-1360 keV 0

50 83-360 keV counts / 0.064 s

0 5 10 15 0

20

T-T_0 (s)

21-83 keV