-200 -150 -100 -50 0 50 100 150 200 250

4000

4500

5000 18-1160 keV counts / 2.944 s

T-T_0 (s)

2800

3000

3200

3400

300-1160 keV 800 1000

1200

1400 70-300 keV counts / 2.944 s

-200 -150 -100 -50 0 50 100 150 200 250 300

400

500

KONUS-WIND GRB 141011 T_0 = 24377.666 s UT (06:46:17.666) S2

T-T_0 (s)

18-70 keV