-1000 -800 -600 -400 -200 0 200

1350

1400

1450

1500

1550

1600

1650

1700

1750

1800

1850

1900 18-1160 keV counts / s

T-T_0 (s)

900 1000

1100

1200

KONUS-WIND GRB 150126 T_0 = 75103.524 s UT (20:51:43.524) S1

300-1160 keV 280 320 360 400 440 480 70-300 keV counts / s

-1000 -800 -600 -400 -200 0 200 120 140 160 180 200

T-T_0 (s)

18-70 keV