0 50 100 150 200

400

600

800 21-1360 keV counts / 0.256 s

T-T_0 (s)

200 300 400 500

360-1360 keV 0 50 100 150 200 83-360 keV counts / 0.256 s

0 50 100 150 0 20 40 60 80

KONUS-WIND GRB 150821 T_0 = 35074.166 s UT (09:44:34.166) S1

T-T_0 (s)

21-83 keV