0 10 20 30 40 50 300 400 500 600 700 800 900 1000

1100 18-1160 keV counts / 0.256 s

T-T_0 (s)

200 300 400 500

300-1160 keV 0

200

400 70-300 keV counts / 0.256 s

0 10 20 30 40 50 0

50

100

KONUS-WIND GRB 160607 T_0 = 40436.923 s UT (11:13:56.923) S2

T-T_0 (s)

18-70 keV