0.00 0.05 0.10 0.15 0.20 0

20

40

60 21-1360 keV counts / 0.002 s

T-T_0 (s)

0

10

20

360-1360 keV 0

20

40 83-360 keV counts / 0.002 s

0.00 0.05 0.10 0.15 0.20 0

10

20

KONUS-WIND GRB 170127 T_0 = 5744.660 s UT (01:35:44.660) S1

T-T_0 (s)

21-83 keV