-200 -150 -100 -50 0 50 100 150 200 250

4000

4500

5000

5500 21-1360 keV counts / 2.944 s

T-T_0 (s)

2600

2800

3000

3200

3400

360-1360 keV 800

1000

1200

83-360 keV counts / 2.944 s

-200 -150 -100 -50 0 50 100 150 200 250 500

600

700

KONUS-WIND GRB 170616 T_0 = 57991.385 s UT (16:06:31.385) S1

T-T_0 (s)

21-83 keV