0 10 20 30 40 50 0

200

400

KONUS-WIND GRB 171120 T_0 = 48000.683 s UT (13:20:00.683) S2 18-1160 keV counts / 0.064 s

T-T_0 (s)

0

100

200

300-1160 keV 0

100

200 70-300 keV counts / 0.064 s

0 10 20 30 40 50 0 20 40 60

T-T_0 (s)

18-70 keV