-0.5 0.0 0.5 1.0 1.5 2.0 2.5 3.0 0

50

100 21-1360 keV counts / 0.016 s

T-T_0 (s)

0

20

40

360-1360 keV 0

20

40 83-360 keV counts / 0.016 s

-0.5 0.0 0.5 1.0 1.5 2.0 2.5 3.0 0 10 20

KONUS-WIND GRB 180529 T_0 = 30554.458 s UT (08:29:14.458) S1

T-T_0 (s)

21-83 keV