0 50 100 150 200 300

400

500

600

700 21-1360 keV counts / 0.256 s

T-T_0 (s)

100 200 300 400

360-1360 keV 0

100

200 83-360 keV counts / 0.256 s

0 50 100 150 200 0

50

100

KONUS-WIND GRB 180623 T_0 = 60141.775 s UT (16:42:21.775) S1

T-T_0 (s)

21-83 keV