0 2 4 6 8 10 12 14 16 18 20 22 24 0

200

400

600

800 21-1360 keV counts / 0.016 s

T-T_0 (s)

0

100

200

360-1360 keV 0

200

400 83-360 keV counts / 0.016 s

0 2 4 6 8 10 12 14 16 18 20 22 24 0

100

KONUS-WIND GRB 190114 T_0 = 75422.341 s UT (20:57:02.341) S1

T-T_0 (s)

21-83 keV