-0.5 0.0 0.5 1.0 1.5 2.0 2.5 3.0 0

500

1000

1500 21-1360 keV counts / 0.016 s

T-T_0 (s)

0 200 400 600

360-1360 keV 0 200 400 600 800 83-360 keV counts / 0.016 s

-0.5 0.0 0.5 1.0 1.5 2.0 2.5 3.0 0 50 100 150

KONUS-WIND GRB 190305 T_0 = 47115.900 s UT (13:05:15.900) S1

T-T_0 (s)

21-83 keV