-0.2 -0.1 0.0 0.1 0.2 0.3 0

20

40

60 21-1360 keV counts / 0.002 s

T-T_0 (s)

0

10

20

360-1360 keV 0 10 20 30 83-360 keV counts / 0.002 s

-0.2 -0.1 0.0 0.1 0.2 0.3 0

10

KONUS-WIND GRB 190606 T_0 = 6903.800 s UT (01:55:03.800) S1

T-T_0 (s)

21-83 keV