0 2 4 6 8 10 12 0

100

200

300

400 18-1160 keV counts / 0.016 s

T-T_0 (s)

0 50 100 150

300-1160 keV 0 50 100 150 70-300 keV counts / 0.016 s

0 2 4 6 8 10 12 0

20

40

KONUS-WIND GRB 200125 T_0 = 74611.206 s UT (20:43:31.206) S2

T-T_0 (s)

18-70 keV