0.00 0.05 0.10 0.15 0.20 0

100

200

300 21-1360 keV counts / 0.002 s

T-T_0 (s)

0

50

100

360-1360 keV 0

100

200 83-360 keV counts / 0.002 s

0.00 0.05 0.10 0.15 0.20 0

50

100

KONUS-WIND GRB 200415 T_0 = 31681.401 s UT (08:48:01.401) S1

T-T_0 (s)

21-83 keV