-0.5 0.0 0.5 1.0 1.5 2.0 2.5 3.0 0

20

40

60

80 21-1360 keV counts / 0.016 s

T-T_0 (s)

0 20 40 60

360-1360 keV 0 10 20 83-360 keV counts / 0.016 s

-0.5 0.0 0.5 1.0 1.5 2.0 2.5 3.0 0

10

20

KONUS-WIND GRB 201109 T_0 = 9065.305 s UT (02:31:05.305) S1

T-T_0 (s)

21-83 keV