-0.2 -0.1 0.0 0.1 0.2 0.3 0

20

40

60

80 21-1360 keV counts / 0.002 s

T-T_0 (s)

0

10

20

360-1360 keV 0

20

40 83-360 keV counts / 0.002 s

-0.2 -0.1 0.0 0.1 0.2 0.3 0

10

20

KONUS-WIND GRB 201227 T_0 = 54846.705 s UT (15:14:06.705) S1

T-T_0 (s)

21-83 keV