0 10 20 30 40 50 60 70 80 300

400

500

600

700

800 21-1360 keV counts / 0.256 s

T-T_0 (s)

200 300 400 500

360-1360 keV 0

100

200 83-360 keV counts / 0.256 s

0 10 20 30 40 50 60 70 80 0

50

100

KONUS-WIND GRB 220927 T_0 = 20180.364 s UT (05:36:20.364) S1

T-T_0 (s)

21-83 keV