-500 0 500 1000 1500 800

1000

1200

1400

1600

1800

2000

2200

CALET-GBM trig.

1371714158

CALET-GBM trig.

1371713313

KONUS-WIND GRB 230625 T_0 = 26937.273 s UT (07:28:57.273) S2 70-300 keV counts / 2.944 s

T-T_0 (s)