-0.2 -0.1 0.0 0.1 0.2 0.3 0.4 0.5 0 200 400 600 800 1000

1200

1400 21-1360 keV counts / 0.002 s

T - T_0, s

0 200 400 600 800 1000

360-1360 keV 0 200 400 600 83-360 keV counts / 0.002 s

-0.2 -0.1 0.0 0.1 0.2 0.3 0.4 0.5 0

10

20

KONUS-WIND 090125 T_0 = 31417.781 s UT (08:43:37.781) S1

T-T_0, sec

21-83 keV