0

100 Ch4 40 - 65.5 keV 0

100 Ch3 25 - 40 keV

counts / 0.002 s

0

50 Ch2 16 - 25 keV 0

25 Ch1 10 - 16 keV

KONUS-RF (Coronas-Photon) SGR burst 090227 T_0=49415.720 s UT (13:43:35.720) S1

0

50 Ch5 65.5 - 105.5 keV

0

25 Ch6 105.5 - 173.5 keV

0

10 Ch7 173.5 - 276.5 keV

0

10 Ch8 276.5 - 449 keV

0

10 Ch9 449 - 728 keV

-1.0 -0.9 -0.8 -0.7 -0.6 -0.5 -0.4 -0.3 0

10 Ch10 728 - 1150 keV

T-T_0, s