-0.5 0.0 0.5 1.0 0

200

400

600

800 18-1160 keV counts / 0.016 s

T-T_0 (s)

0 200 400 600 800

300-1160 keV 0 20 40 70-300 keV counts / 0.016 s

-0.5 0.0 0.5 1.0 0 10 20 30

KONUS-WIND SGR 1935+2154 burst 210911

T_0 = 61274.025 s UT (17:01:14.025) S2

T-T_0 (s)

18-70 keV