-0.3 -0.2 -0.1 0.0 0.1 0.2 0.3 0

50

100

150 18-1160 keV counts / 0.002 s

T-T_0 (s)

0 50 100 150

300-1160 keV 0

10

20 70-300 keV counts / 0.002 s

-0.3 -0.2 -0.1 0.0 0.1 0.2 0.3 0

10

KONUS-WIND SGR 1935+2154 burst 221017

T_0 = 40483.010 s UT (11:14:43.010) S2

T-T_0 (s)

18-70 keV