– 13 –

Fig. 1.— GRB 950210. T_0=8424.148 s UT.

Fig. 2.— GRB 950211a. T_0=8697.749 s UT.

– 14 –

Fig. 3.— GRB 950414. T_0=40882.798 s UT.

Fig. 4.— GRB 950419a. T_0=8628.860 s UT.

– 15 –

Fig. 5.— Energy spectrum of the GRB 950419a. T_0=8628.860 s UT (continued from Fig. 4).

Fig. 6.— GRB 950520. T_0=83271.404 s UT.

– 16 –

Fig. 7.— GRB 950610b. T_0=19096.034 s UT.

Fig. 8.— GRB 950726. T_0=51579.299 s UT.

– 17 –

Fig. 9.— GRB 950805b. T_0=13454.144 s UT.

Fig. 10.— GRB 951013. T_0=57097.299 s UT.

– 18 –

Fig. 11.— GRB 951014a. T_0=13108.167 s UT.

Fig. 12.— GRB 951014a. T_0=13108.167 s UT (continued from Fig. 11).

– 19 –

Fig. 13.— GRB 951014a. T_0=13108.167 s UT (continued from Fig. 11).

Fig. 14.— GRB 960312. T_0=35074.697 s UT.

– 20 –

Fig. 15.— GRB 960319. T_0=51992.828 s UT.

Fig. 16.— GRB 960420. T_0=16844.809 s UT.

– 21 –

Fig. 17.— GRB 960519. T_0=14766.283 s UT.

Fig. 18.— GRB 960602. T_0=42664.032 s UT.

– 22 –

Fig. 19.— GRB 960610. T_0=84502.254 s UT.

Fig. 20.— GRB 960614. T_0=67654.516 s UT.

– 23 –

Fig. 21.— GRB 960803. T_0=67525.033 s UT.

Fig. 22.— GRB 960902. T_0=58097.128 s UT.

– 24 –

Fig. 23.— GRB 960902. T_0=58097.128 s UT (continued from Fig. 22).

Fig. 24.— GRB 960908. T_0=25028.442 s UT.

– 25 –

Fig. 25.— GRB 960908. T_0=25028.442 s UT (continued from Fig. 24).

Fig. 26.— GRB 961113. T_0=80522.580 s UT.

– 26 –

Fig. 27.— GRB 961123. T_0=59317.593 s UT.

Fig. 28.— GRB 961212. T_0=14870.487 s UT.

– 27 –

Fig. 29.— Energy spectrum of the GRB 961212. T_0=14870.487 s UT (continued from Fig. 28).

Fig. 30.— GRB 970222. T_0=86006.565 s UT.

– 28 –

Fig. 31.— Energy spectrum of the GRB 970222. T_0=86006.565 s UT (continued from Fig. 30).

Fig. 32.— GRB 970315b. T_0=30064.853 s UT.

– 29 –

Fig. 33.— GRB 970330. T_0=43988.805 s UT.

Fig. 34.— GRB 970427. T_0=45723.327 s UT.

– 30 –

Fig. 35.— GRB 970428. T_0=13365.268 s UT.

Fig. 36.— Energy spectrum of the GRB 970428. T_0=13365.268 s UT (continued from Fig. 35).

– 31 –

Fig. 37.— GRB 970506. T_0=56603.264 s UT.

Fig. 38.— GRB 970506. T_0=56603.264 s UT (continued from Fig. 37).

– 32 –

Fig. 39.— GRB 970521. T_0=49991.214 s UT.

Fig. 40.— GRB 970608. T_0=49032.954 s UT.

– 33 –

Fig. 41.— GRB 970625a. T_0=23681.548 s UT.

Fig. 42.— GRB 970626. T_0=6239.033 s UT.

– 34 –

Fig. 43.— GRB 970704. T_0=4097.025 s UT.

Fig. 44.— Energy spectra of the GRB 970704. T_0=4097.025 s UT (continued from Fig. 43).

– 35 –

Fig. 45.— GRB 970803. T_0=66535.704 s UT.

Fig. 46.— GRB 970902a. T_0=27561.329 s UT.

– 36 –

Fig. 47.— GRB 970921. T_0=83828.200 s UT.

Fig. 48.— GRB 971015. T_0=30459.796 s UT.

– 37 –

Fig. 49.— GRB 971031. T_0=23420.942 s UT.

Fig. 50.— GRB 971118. T_0=29008.529 s UT.

– 38 –

Fig. 51.— GRB 971218b. T_0=52503.029 s UT.

Fig. 52.— GRB 971218b. T_0=52503.029 s UT (continued from Fig. 51).

– 39 –

Fig. 53.— GRB 971230. T_0=83750.187 s UT.

Fig. 54.— GRB 980205. T_0=19785.239 s UT.

– 40 –

Fig. 55.— Energy spectrum of the GRB 980205. T_0=19785.239 s UT (continued from Fig. 54).

Fig. 56.— GRB 980218b. T_0=54768.157 s UT.

– 41 –

Fig. 57.— GRB 980228a. T_0=24244.602 s UT.

Fig. 58.— Energy spectrum of the GRB 980228a. T_0=24244.602 s UT (continued from Fig. 57).

– 42 –

Fig. 59.— GRB 980302b. T_0=29955.993 s UT.

Fig. 60.— GRB 980310a. T_0=50261.054 s UT.

– 43 –

Fig. 61.— Energy spectrum of the GRB 980310a. T_0=50261.054 s UT (continued from Fig. 60).

Fig. 62.— GRB 980330a. T_0=96.711 s UT.

– 44 –

Fig. 63.— GRB 980331. T_0=61078.449 s UT.

Fig. 64.— GRB 980429. T_0=20492.079 s UT.

– 45 –

Fig. 65.— GRB 980430. T_0=59702.214 s UT.

Fig. 66.— GRB 980605. T_0=51131.976 s UT.

– 46 –

Fig. 67.— GRB 980605. T_0=51131.976 s UT (continued from Fig. 66).

Fig. 68.— GRB 980610a. T_0=71546.850 s UT.

– 47 –

Fig. 69.— GRB 980610b. T_0=86195.164 s UT.

Fig. 70.— GRB 980619. T_0=47530.372 s UT.

– 48 –

Fig. 71.— GRB 980706a. T_0=57586.277 s UT.

Fig. 72.— GRB 980706a. T_0=57586.277 s UT (continued from Fig. 71).

– 49 –

Fig. 73.— GRB 980904. T_0=31349.014 s UT.

Fig. 74.— GRB 980908. T_0=82263.835 s UT.

– 50 –

Fig. 75.— GRB 980925a. T_0=17571.284 s UT.

Fig. 76.— GRB 981005. T_0=64826.466 s UT.

– 51 –

Fig. 77.— GRB 981102. T_0=28554.533 s UT.

Fig. 78.— GRB 981107. T_0=781.395 s UT.

– 52 –

Fig. 79.— GRB 981107. T_0=781.395 s UT (continued from Fig. 78).

Fig. 80.— Energy spectra of the GRB 981107. T_0=781.395 s UT (continued from Fig. 78).

– 53 –

Fig. 81.— GRB 981218. T_0=62134.933 s UT.

Fig. 82.— GRB 981221. T_0=9057.150 s UT.

– 54 –

Fig. 83.— GRB 981226. T_0=38822.991 s UT.

Fig. 84.— GRB 981226. T_0=38822.991 s UT (continued from Fig. 83).

– 55 –

Fig. 85.— GRB 990105. T_0=31789.507 s UT.

Fig. 86.— GRB 990126. T_0=51844.333 s UT.

– 56 –

Fig. 87.— GRB 990206c. T_0=57061.328 s UT.

Fig. 88.— GRB 990207. T_0=69675.009 s UT.

– 57 –

Fig. 89.— GRB 990208. T_0=15166.066 s UT.

Fig. 90.— GRB 990313. T_0=33712.652 s UT.

– 58 –

Fig. 91.— GRB 990313. T_0=33712.652 s UT (continued from Fig. 90).

Fig. 92.— GRB 990327. T_0=22911.102 s UT.

– 59 –

Fig. 93.— GRB 990327. T_0=22911.102 s UT (continued from Fig. 92).

Fig. 94.— GRB 990405b. T_0=30059.858 s UT.

– 60 –

Fig. 95.— GRB 990415. T_0=2297.309 s UT.

Fig. 96.— GRB 990504. T_0=67586.484 s UT.

– 61 –

Fig. 97.— GRB 990516. T_0=86065.136 s UT.

Fig. 98.— Energy spectra of the GRB 990516. T_0=86065.136 s UT (continued from Fig. 97).

– 62 –

Fig. 99.— GRB 990516. T_0=86065.136 s UT (continued from Fig. 97, 98).

Fig. 100.— GRB 990619. T_0=46930.367 s UT.

– 63 –

Fig. 101.— GRB 990712a. T_0=27915.510 s UT.

Fig. 102.— GRB 990712a. T_0=27915.510 s UT (continued from Fig. 101).

– 64 –

Fig. 103.— Energy spectrum of the GRB 990712a. T_0=27915.510 s UT (continued from Fig. 102).

Fig. 104.— GRB 990719. T_0=61135.420 s UT.

– 65 –

Fig. 105.— GRB 990720. T_0=75941.940 s UT.

Fig. 106.— GRB 990806b. T_0=60168.676 s UT.

– 66 –

Fig. 107.— GRB 990828. T_0=70020.016 s UT.

Fig. 108.— GRB 990828. T_0=70020.016 s UT (continued from Fig. 107).

– 67 –

Fig. 109.— GRB 990831. T_0=41835.091 s UT.

Fig. 110.— GRB 991001. T_0=4950.128 s UT.

– 68 –

Fig. 111.— GRB 991002. T_0=82143.664 s UT.

Fig. 112.— GRB 991226b. T_0=83339.767 s UT.

– 69 –

Fig. 113.— GRB 000108. T_0=60487.439 s UT.

Fig. 114.— GRB 000212. T_0=61592.339 s UT.

– 70 –

Fig. 115.— GRB 000218. T_0=58744.596 s UT.

Fig. 116.— GRB 000218. T_0=58744.596 s UT (continued from Fig. 115).

– 71 –

Fig. 117.— Energy spectra of the GRB 000218. T_0=58744.596 s UT (continued from Fig. 116).

Fig. 118.— GRB 000326. T_0=19134.798 s UT.

– 72 –

Fig. 119.— GRB 000412. T_0=42174.189 s UT.

Fig. 120.— GRB 000420a. T_0=42271.144 s UT.

– 73 –

Fig. 121.— GRB 000513. T_0=40894.793 s UT.

Fig. 122.— GRB 000526. T_0=84494.896 s UT.

– 74 –

Fig. 123.— GRB 000607. T_0=8689.115 s UT.

Fig. 124.— GRB 000608. T_0=70497.255 s UT.

– 75 –

Fig. 125.— GRB 000623. T_0=3887.359 s UT.

Fig. 126.— GRB 000701b. T_0=25961.013 s UT.

– 76 –

Fig. 127.— GRB 000701b. T_0=25961.013 s UT (continued from Fig. 126).

Fig. 128.— GRB 000707a. T_0=17372.072 s UT.

– 77 –

Fig. 129.— GRB 000727. T_0=70955.931 s UT.

Fig. 130.— Energy spectrum of the GRB 000727. T_0=70955.931 s UT (continued from Fig. 129).

– 78 –

Fig. 131.— GRB 000727. T_0=70955.931 s UT (continued from Fig. 129, 130).

Fig. 132.— GRB 000818. T_0=72547.040 s UT.

– 79 –

Fig. 133.— GRB 000928. T_0=6285.374 s UT.

Fig. 134.— GRB 001022. T_0=20905.666 s UT.

– 80 –

Fig. 135.— GRB 001025c. T_0=71369.963 s UT.

Fig. 136.— GRB 001204. T_0=28869.372 s UT.

– 81 –

Fig. 137.— GRB 001207a. T_0=8815.958 s UT.

Fig. 138.— GRB 001207b. T_0=34185.588 s UT.

– 82 –

Fig. 139.— GRB 001207b. T_0=34185.588 s UT (continued from Fig. 138).

Fig. 140.— GRB 010119. T_0=37179.556 s UT.

– 83 –

Fig. 141.— GRB 010308. T_0=56338.468 s UT.

Fig. 142.— GRB 010420a. T_0=30786.674 s UT.

– 84 –

Fig. 143.— GRB 010427. T_0=67452.969 s UT.

Fig. 144.— GRB 010616. T_0=23724.080 s UT.

– 85 –

Fig. 145.— GRB 010624. T_0=48929.130 s UT.

Fig. 146.— GRB 010628a. T_0=4206.816 s UT.

– 86 –

Fig. 147.— GRB 011024. T_0=74609.296 s UT.

Fig. 148.— GRB 011024. T_0=74609.296 s UT (continued from Fig. 147).

– 87 –

Fig. 149.— GRB 011101. T_0=34754.534 s UT.

Fig. 150.— GRB 020116. T_0=67773.429 s UT.

– 88 –

Fig. 151.— GRB 020117. T_0=45909.324 s UT.

Fig. 152.— GRB 020218a. T_0=74609.296 s UT.

– 89 –

Fig. 153.— GRB 020306. T_0=68280.713 s UT.

Fig. 154.— GRB 020326. T_0=39182.941 s UT.

– 90 –

Fig. 155.— GRB 020426. T_0=39182.941 s UT.

Fig. 156.— GRB 020504. T_0=55835.141 s UT.

– 91 –

Fig. 157.— GRB 020504. T_0=55835.141 s UT (continued from Fig. 157).

Fig. 158.— GRB 020509. T_0=74.563 s UT.

– 92 –

Fig. 159.— GRB 020525a. T_0=16014.630 s UT.

Fig. 160.— GRB 020602b. T_0=63030.315 s UT.

– 93 –

Fig. 161.— GRB 020715a. T_0=54866.135 s UT.

Fig. 162.— GRB 020731a. T_0=1635.905 s UT.

– 94 –

Fig. 163.— GRB 020731b. T_0=50231.739 s UT.

Fig. 164.— GRB 020828. T_0=20737.981 s UT.

– 95 –

Fig. 165.— Duration distribution. Fig. 166.— Fluence vs duration distribution.

Fig. 167.— Fluence distribution. Fig. 168.— Cumulative fluence distribution.

– 96 –

Fig. 169.— Peak flux distribution. Fig. 170.— Cumulative peak flux distribution.

Fig. 171.— E_p distribution (E_p is the energy at which the EF_E -spectrum (F_E = E dN/dE) reaches its maximum).

Fig. 172.— Peak flux vs E_p distribution.